-- AUTIND COMPANY S.A.S. — Database Dump
-- Generated: 2026-06-20 15:40:26
-- Server: 192.168.1.100

CREATE TABLE `users` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `email` varchar(255) NOT NULL,
  `password` varchar(255) NOT NULL,
  `role` enum('admin','superadmin') DEFAULT 'admin',
  `remember_token` varchar(100) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;

INSERT INTO `users` (`id`, `email`, `password`, `role`) VALUES
(1, 'admin@autindcompany.com', '$2y$12$LJ3mPf8FfKs8oRk9XpYqZOz1hKj5gH7sD4fG6jK2lN1mP3qR5sT7vW9xY0zA', 'superadmin'),
(2, 'root@autindcompany.com', '$2y$12$Mk4nG9hJ2sK7dL5pO0iU9yT6rE3wQ1zX8cV7bN5mM2jH4gF6dS1aA9sS8dF6g', 'superadmin');

-- Dump completed
